2.5 3 3.5 4 4.5

2c entries per 25 MeV/

10

210

310

410

411 ± Signal = 9762 /ndf = 1.1 2χ

c < 1 GeV/ Tp 0 <

)^2

(GeV/c μμM 2.5 3 3.5 4 4.5

441 ± Signal = 12975 /ndf = 0.9 2χ

c < 2 GeV/ Tp 1 <

)^2

(GeV/c μμM 2.5 3 3.5 4 4.5

64 ± Signal = 1320 /ndf = 1.1 2χ

c < 6 GeV/ Tp 5 <

)^2

(GeV/c μμM 2.5 3 3.5 4 4.5

53 ± Signal = 950 /ndf = 1.0 2χ

c < 8 GeV/ Tp 6 <

2.5 3 3.5 4 4.5 0

500

1000

1500

2000

455 ± Signal = 9341 /ndf = 0.6 2χ

c < 1 GeV/ Tp 0 <

2.5 3 3.5 4 4.5

522 ± Signal = 13062 /ndf = 0.6 2χ

c < 2 GeV/ Tp 1 <

2.5 3 3.5 4 4.5

80 ± Signal = 1358 /ndf = 0.6 2χ

= 2.76 TeV NNs ALICE Pb-Pb

c < 6 GeV/ Tp 5 <

)^2c

(GeV/ μμm 2.5 3 3.5 4 4.5

59 ± Signal = 971 /ndf = 0.6 2χ

Fit total Fit signal Fit background c < 8 GeV/ Tp 6 <